[Entry]
Entry_Name=MC-link.NET
[Phone]
Area_Code=
Phone_Number=7020005002
Country_Code=
Country_ID=
Dial_As_Is=Yes
Ignore_dial_tone=Yes
[TCP/IP]
Specify_Server_Address=No
IP_Header_Compress=Yes
DNS_Address=195.110.128.1
DNS_Alt_Address=212.48.4.11
Gateway_On_Remote=Yes
[URL]
Home_Page=http://www.mclink.net
NoWelcome=1
[User]
Requires_Logon=Yes
Name=mclink@mclink.net
Password=mclink
[Server]
Negotiate_TCP/IP=Yes
Negotiate_IPX/SPX=No
Negotiate_NetBEUI=No
Network_Logon=No
Disable_LCP=No
PW_Encrypt=No
SW_Compress=No
Type=PPP
[ApplyInsSec]
DontApplyIns=1
[Branding]
NoClear=1
Serverless=1
[ConnectionSettings]
ApplyInsToConnection=MC-link.NET